
    SWAP SPACE USAGE

    The information shown is the total amount of swap space in KB, the
    amount used, the amount available, and the amount used as a
    percentage. The rest of this section describes how to use this
    window's buttons.

    Processes

    To view the processes, highlight the hosts you wish to view and
    click on the Processes button. A window will appear displaying all
    processes for the highlighted hosts. 

    Graph

    To graph the swap space usage, highlight the information you wish to
    view and then click on the Graph button. A window will appear
    displaying the amount of free and used swap space for each
    highlighted host in a stacked bar graph format. The left axis shows
    the number of KB of swap space.
